-8 -7 -6 -5 -4 -3 -2

0 5 10 15 20 25 30 35 40

i

0 5 10 15 20 25 30 35 40

j

X Y

Z

Fig.7c. Coefficients A for steady state at Re = 2471 and = 1 ij γ

log|A |ij