-0.4 -0.2 0 0.2 0.4 r 0.3

0.6

0.9

1.2

1.5

z

t=10,000 r0=0.01-0.1(0.001) z0=0.35-0.47(0.01), resolution 40x40, Fa=0.001, Fc=0.0001